% LaTeX file for resume 
% This file uses the resume document class (res.cls)

\documentclass[11pt,centered,letter]{res} 
\usepackage{multicol}
\usepackage{hyperref}
\usepackage[left=1in,right=1.5in,top=1in,bottom=1in]{geometry}
%\pagestyle{myheadings}

%\usepackage{helvetica} % uses helvetica postscript font (download helvetica.sty)
%\usepackage{newcent}   % uses new century schoolbook postscript font 
%\setlength{\textheight}{9.5in} % increase text height to fit on 1-page
\begin{document} 
\name{\huge Carter J. Schultz\\ [12pt]}     % the \\[12pt] adds a blank
				        % line after name      


\address{918 14th Street\\Boulder, CO \\ 80302}
\address{ CarterJSchultz@gmail.com \\ www.CarterSchultz.com \\  (307) 631-8060 }

                                  
\begin{resume}
\section{EDUCATION}          
    University of Wyoming, Laramie, WY  \\        
    Bachelors of Science in Mechanical Engineering - Spring 2015   \\       
    G.P.A. 3.75/4.0

\section{EXPERIENCE}
   \vspace{-0.1in}	
   \begin{tabbing}
   \hspace{2.6in}\= \hspace{2.3in}\= \kill % set up two tab positions
    {\bf Robotics Engineer} \>Neya Systems     \>2016 - Present\\
                             \>Pittsburgh, PA \> 
   \end{tabbing}\vspace{-10pt}      % suppress blank line after tabbing
\begin{itemize} %%%%%%%%%%%%%%%%%%%SpaceX
\item Developed modular planning engine for multi-robot mission planning
\item Created user interfaces for visualizing and manipulating large graph networks
\item Developed a feed forward simulation framework for performance prediction
\item Performed profiling and optimization of high performance compute code
\end{itemize}

   \vspace{-0.1in}	
   \begin{tabbing}
   \hspace{2.6in}\= \hspace{2.3in}\= \kill % set up two tab positions
    {\bf Launch Automation Engineer} \>SpaceX     \>2015-2016\\
                             \>Hawthorne, CA \> 
   \end{tabbing}\vspace{-10pt}      % suppress blank line after tabbing
\begin{itemize} %%%%%%%%%%%%%%%%%%%SpaceX
\item Upgraded tooling for automated rocket processing and recovery operations
\item Developed vision system for autonomous alignment of rocket and ground equipment
\item Created probabilistic collision models for automated crane operations
\item Designed and fabricated custom sensor packages to survive launch environment
\end{itemize}
   \begin{tabbing}
   \hspace{2.6in}\= \hspace{2.3in}\= \kill % set up two tab positions
    {\bf Robotics Intern} \>Neya Systems     \>Summers 2013-14\\
                             \>Pittsburgh, PA
   \end{tabbing}\vspace{-10pt}      % suppress blank line after tabbing

\begin{itemize} %%%%%%%%%%%%%%%%%%%NEYA SECTION
\item Developed ROS interfaces for autonomous operation of micro-UAVs
\item Created OpenCV based object tracking software for automated surveillance
\item Implemented mission behaviors and autonomous capabilities for mobile robots
\item Designed and manufactured custom components for robotic platforms
\end{itemize}
   \begin{tabbing}
   \hspace{2.6in}\= \hspace{2.3in}\= \kill % set up two tab positions
    {\bf EPSCoR Undergraduate Fellow} \>EPSCoR Program     \>2012 - 2014\\
                             \>Laramie, WY \>  
   \end{tabbing}\vspace{-10pt}      % suppress blank line after tabbing

\begin{itemize}
\item Developed microcontroller driven graphics system for high resolution LCD
\item Created microcontroller compatible algorithms for robotic navigation
\item Designed distributed computation system for microcontroller networks
\end{itemize}
   \begin{tabbing}%
   \hspace{2.6in}\= \hspace{2.275in}\= \kill % set up two tab positions          
   {\bf Systems Programmer}  \>Square One Systems Design \> Summers  2010-12\\
                          \>Jackson, WY
   \end{tabbing}\vspace{-10pt}
\begin{itemize}
\item Solved complex kinematic and positions planning problems on six-DOF parallel robots
\item Programmed natural and adaptive human interfaces for robotic control in NI-Labview
\item Implemented autonomous functionality for mobile platforms including: path-planning, obstacle detection, mapping, and error recovery
\item Developed cataloging and database systems for product quality assurance
\end{itemize}
\section{RELEVANT SKILLS}          
\begin{multicols}{2}
{\bf Mechanical}
\begin{itemize}
\item Machining: Mill, Lathe, CNC
\item 3D Modeling: Solidworks, NX, \\Inventor, Blender, OnShape
\item FEA: Femap, Abaqus, ANSYS
\item Mechanical Tolerances with GD\&T
\end{itemize}
{\bf Electrical}
\begin{itemize}
\item Microcontroller Debugging
\item Electronics Soldering and Assembly
\item Signal Capture and Analysis
\item Electronic Design for Robotic Systems
\end{itemize}
\end{multicols}
{\bf Software}
\begin{itemize}
\item Development with Linux and Windows
\item Robotic Algorithms: Path-Planning, Point Cloud Analysis, Kinematic Modeling, Probabilistic Data Filtering, Machine Vision, and Grip Analysis
\item Proficiency With: Git, CMake, Boost, ROS, OpenCV, and PCL
\end{itemize}



\section{PROGRAMMING LANGUAGES}
\begin{ncolumn}{2}
\verb!Labview! & \verb!C++/C! \\
Experience: 6 years & Experience: 5 years\\
Proficiency: Expert & Proficiency: Expert \\
&\\
\verb!Matlab! & \verb!Java! \\
Experience: 3 years & Experience: 3 years\\
Proficiency: Intermediate & Proficiency: Intermediate \\
&\\
\verb!Mathematica! & \verb!Python! \\
Experience: 2 years & Experience: 2 years\\
Proficiency: Intermediate & Proficiency: Novice \\

\end{ncolumn}
 
 
\section{HONORS AND AWARDS}          
    University of Wyoming Trustees Full Scholarship   \\      
    Dean's List of Distinguished Students: Fall 2011 - Spring 2012  \\        
    Tau Beta Pi Outstanding Freshman Award  \\        
    Kinser Jazz Festival Outstanding Musicianship Award 
    
 
%\section{REFERENCES}          
%	Dr. Parag Batavia, Ph.D. Robotics Engineering\\
%	Founder and President, Neya Systems \\
%	Relation: Supervisor at Neya Systems \\
%	Office: (724) 799-8078 \\
%	E-mail: paragb@neyasystems.com
%
%       	Dr. Wesley Womack, Ph.D. Mechanical Engineering \\
%	Senior Engineer, Epsilon Technology \\
%       	Relation: Supervisor at Square One Systems Design \\
%      	Mobile: (970) 556-3716 \\
%	E-mail: wjwomack@gmail.com
%
%	Dr. Steven Barrett, Ph.D. Electrical Engineering \\
%	Associate Dean, College of Engineering - University of Wyoming \\
%	Relation: Professor and Undergraduate Research Supervisor \\
%	Office: (307) 766-6181 \\
%	E-mail: steveb@uwyo.edu 

	


 
\end{resume}
\end{document}